

-- 导出  表 UDIMS.auth_platform 结构
CREATE TABLE IF NOT EXISTS `auth_platform` (
  `id` varchar(36) NOT NULL,
  `name` varchar(100) DEFAULT NULL,
  `host` varchar(200) DEFAULT NULL,
  PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_0900_ai_ci;

-- 正在导出表  UDIMS.auth_platform 的数据：~0 rows (大约)
/*!40000 ALTER TABLE `auth_platform` DISABLE KEYS */;
INSERT INTO `auth_platform` (`id`, `name`, `host`) VALUES
	('204766e7381a477588e7742ed28c6f4e', '片仔癀', 'http://123.123.123.123:8080');
/*!40000 ALTER TABLE `auth_platform` ENABLE KEYS */;

INSERT INTO `auth_permission_rule` (pid,name,title,status,listorder,create_time,update_time) 
VALUES ('51', 'admin/platform', '自助平台列表', '1',  '999', '2022-02-27 07:56:47', '2022-02-27 07:56:47');


alter table IO_UNIT_MAINTAIN add column (platform_id                varchar(36));
  
alter table IO_UNIT_MAINTAIN add column (appid                      varchar(100),
 api_key  varchar(64),
 secret_key                 varchar(2000));