#   字段新增   （表名，字段名，字段类型，修改方式（1：新增，2：修改，3：删除）

CREATE TABLE IF NOT EXISTS `device_inspect_task`
(
    `id`            int                                                           NOT NULL AUTO_INCREMENT,
    `orderId`       varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '任务单号',
    `planOrderIdFk` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '巡检计划单号（外键）',
    `deptCode`      varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '部门',
    `invCode`       varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '仓库',
    `code`          varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '资产编码',
    `status`        int                                                           NULL DEFAULT NULL COMMENT  '状态',
    `type`          int                                                           NULL DEFAULT NULL COMMENT  '类型',
    `inspectUser`   varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '巡检人',
    `remindTime`    datetime(0)                                                   NULL DEFAULT NULL COMMENT '提醒时间',
    `remark`        varchar(512) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '巡检备注',
    `strartTime`    datetime(0)                                                   NULL DEFAULT NULL COMMENT '任务开始时间',
    `endTime`       datetime(0)                                                   NULL DEFAULT NULL COMMENT '任务结束时间',
    `createTime`    datetime(0)                                                   NULL DEFAULT NULL COMMENT '创建时间',
    `updateTime`    datetime(0)                                                   NULL DEFAULT NULL COMMENT '更新时间',
    `expectedTime`  datetime(0)                                                   NULL DEFAULT NULL COMMENT '预期结束时间',
    PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB
  CHARACTER SET = utf8mb4
  COLLATE = utf8mb4_0900_ai_ci
  ROW_FORMAT = Dynamic;

-- ----------------------------
-- Table structure for device_inspect_task_detail
-- ----------------------------
CREATE TABLE IF NOT EXISTS `device_inspect_task_detail`
(
    `id`             int                                                           NOT NULL AUTO_INCREMENT,
    `projectCode`    varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '巡检项目编码',
    `projectContent` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '巡检内容',
    `status`         int                                                            NULL DEFAULT NULL COMMENT '状态（1：未开始；2：已检查；3：异常；4：不巡检',
    `result`         varchar(512) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '巡检结果备注',
    `inspectImage`   varchar(512) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '巡检图片',
    `inspectUser`    varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '巡检人',
    `updateTime`     datetime(0)                                                   NULL DEFAULT NULL COMMENT '更新时间',
    `taskOrderIdFk`  varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '巡检任务ID外键',
    PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB
  CHARACTER SET = utf8mb4
  COLLATE = utf8mb4_0900_ai_ci
  ROW_FORMAT = Dynamic;

-- ----------------------------
-- Table structure for device_project_set
-- ----------------------------
CREATE TABLE IF NOT EXISTS `device_project_set`
(
    `id`         int                                                           NOT NULL AUTO_INCREMENT,
    `code`       varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '项目编号',
    `content`    varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '项目内容',
    `type`       int                                                           NULL DEFAULT NULL COMMENT '项目类型：1：巡检；2：养护',
    `remak`      varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '备注',
    `udpateTime` datetime(0)                                                   NULL DEFAULT NULL COMMENT '更新时间',
    `updateUser` varchar(0) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci   NULL DEFAULT NULL COMMENT '更新人',
    `createUser` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '创建人',
    `createTime` datetime(0)                                                   NULL DEFAULT NULL COMMENT '创建时间',
    PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB
  CHARACTER SET = utf8mb4
  COLLATE = utf8mb4_0900_ai_ci
  ROW_FORMAT = Dynamic;

SET FOREIGN_KEY_CHECKS = 1;


CALL Pro_Temp_ColumnWork('device_repair_order', 'repairType', 'tinyint', 1);
CALL Pro_Temp_ColumnWork('device_repair_order', 'urgencyType', 'tinyint', 1);
CALL Pro_Temp_ColumnWork('device_repair_order', 'planTime', 'datetime', 1);
CALL Pro_Temp_ColumnWork('device_repair_order', 'uploadImage', 'text', 1);
CALL Pro_Temp_ColumnWork('device_repair_order', 'repariName', 'varchar(255)', 1);
CALL Pro_Temp_ColumnWork('device_repair_order', 'reparistartTime', 'datetime', 1);
CALL Pro_Temp_ColumnWork('device_repair_order', 'repariEndTime', 'datetime', 1);
CALL Pro_Temp_ColumnWork('device_repair_order', 'repariRemark', 'varchar(255)', 1);
CALL Pro_Temp_ColumnWork('device_repair_order', 'repariImage', 'text', 1);

CALL Pro_Temp_ColumnWork('device_inspect_plan', 'startTime', 'datetime', 1);
CALL Pro_Temp_ColumnWork('device_inspect_plan', 'endTime', 'datetime', 1);
CALL Pro_Temp_ColumnWork('device_inspect_plan', 'frequency', 'varchar(255)', 1);
CALL Pro_Temp_ColumnWork('device_inspect_plan', 'frequencyUnit', 'tinyint', 1);
CALL Pro_Temp_ColumnWork('device_inspect_plan', 'planStatus', 'tinyint', 1);
CALL Pro_Temp_ColumnWork('device_inspect_plan', 'inspectUser', 'varchar(255)', 1);
CALL Pro_Temp_ColumnWork('device_inspect_plan', 'lastTime', 'datetime', 1);
CALL Pro_Temp_ColumnWork('device_inspect_plan', 'nextTime', 'datetime', 1);
INSERT ignore INTO  `sys_param_config`(`id`, `parentId`, `paramName`, `paramKey`, `paramValue`, `paramStatus`, `paramType`, `paramExplain`, `updateTime`) VALUES (2088, 0, '是否只校验批次号', 'only_vail_batch', '0', 0, 0, '是否只校验批次号(0：否；1：是)', NULL);

CALL Pro_Temp_ColumnWork('device_inspect_task', 'repairType', 'tinyint', 1);
CALL Pro_Temp_ColumnWork('device_inspect_task', 'level', 'tinyint', 1);


CALL Pro_Temp_ColumnWork('io_order', 'preInSelected', 'tinyint', 1);

#
# 	update  io_order set preInSelected = 1  WHERE io_order.billNo in (select checkPreInOrders from (select checkPreInOrders from  io_order  WHERE checkPreInOrders is not null GROUP BY checkPreInOrders) a) ;

